Erratum: ^Phase equilibria in ternary Lennard-Jones systems~, Fluid Phase

Equilibria , 107 (1995): 31-43.

J. Vorholz, V. I. Harismiadis, A. Z. Panagiotopoulos 1

School of Chemical Engineering, Cornell University, Ithaca, NY 14853-5201, USA

The reduced equilibrium vapor densities ( r

V

* = r

V

s

V

3 ) for the system with e

22

/ e

11

=0.75, e

33

/ e

11

=0.50, s

22

/ s

11

=0.75, s

33

/ s

11

=0.50 (system 1) were incorrectlyreported in table 2, because of an error in the conversion factor. The correct values are reproduced below:

x x

2

L

* =

L L

3 y

1 y

2 V

* =

V V

3

0.59(1) 0 0.59(3) 0.14(2) 0 0.048(2)

0.56(2) 0.100(3) 0.60(3) 0.14(2) 0.100(2) 0.056(3)

0.45(1) 0.259(9) 0.58(3) 0.110(8) 0.243(6) 0.063(3)

0.35(1) 0.450(9) 0.58(3) 0.10(1) 0.45(1) 0.083(5)

0.21(1) 0.69(1) 0.54(3) 0.062(6) 0.72(1) 0.107(8)

0.102(4) 0.898(4) 0.48(4) 0.038(3) 0.962(3) 0.158(9)

1 Corresponding author. Internet: azp2@cornell.edu